Table 3. Preseismic and postseismic station velocities relative to PAWTStation Preseismic Model (mm/yr)Postseismic (mm/yr)East+/-North+/-East+/-North+/-Up+/-CLIF-3.91.34.21.1-7.91.08.01.06.06.5GREG-2.11.23.11.3-7.91.08.61.03.96.8FIRE-1.31.22.11.1-3.90.87.80.8-9.55.5LP4_0.51.10.61.4-2.31.02.91.0-6.66.8LP2_0.31.00.61.10.91.03.01.0-2.26.8END_1.51.1-0.31.41.20.9-0.50.9-22.96.2LP1_1.71.0-0.51.31.00.8-4.90.7-14.25.1MAZZ3.31.1-1.81.6-0.71.0-15.11.0-13.16.8CALE4.01.0-2.61.6-0.71.0-12.81.1-15.06.8COY_5.31.0-3.91.9-2.11.0-10.81.0-7.26.7HAMI13.11.3-16.21.87.20.9-20.10.8-9.05.8MOCH13.21.3-19.22.08.61.1-19.01.1-9.77.4OSO113.21.3-20.12.18.61.3-19.11.3-5.68.8BRUS-7.82.17.81.8-7.70.89.80.814.35.7EAGL-3.00.83.10.7-7.01.15.81.0-4.47.3ALLI8.31.3-11.61.33.41.0-12.90.9-10.96.2PIGN-3.30.83.31.3-5.60.77.40.74.25.6HLMR-2.90.73.11.1-5.50.65.90.6-1.65.0HAUL-2.10.52.60.9-5.00.73.70.85.26.6TRUE-1.00.31.20.4-4.00.51.90.5-9.84.1BM10-0.40.20.50.2-1.20.6-1.00.7-3.34.9FOOT1.40.5-1.60.4-2.20.6-0.30.6-7.64.7BEND2.60.9-3.70.72.00.6-6.80.61.14.6BAYS3.21.7-6.11.80.01.3-9.61.58.45.7ANTE7.12.8-11.01.76.50.9-11.01.0-4.67.0SHER8.81.4-12.91.66.91.1-13.61.2-4.18.4SANA10.51.5-15.91.58.81.3-16.91.40.79.9USG711.51.5-17.71.711.01.4-18.11.46.29.9BM1111.51.5-18.41.78.51.6-18.31.70.312.1MEDA11.41.6-19.31.810.41.2-19.71.3-1.89.0JACK7.11.6-13.11.66.31.6-16.81.6-4.810.4LOMA1.71.0-0.61.31.20.8-2.90.87.45.7BRIG0.50.70.10.7-1.31.1-0.61.110.07.8METC6.01.1-4.82.0-2.50.9-8.10.910.46.2PERR5.51.0-4.11.9-1.91.1-9.21.021.97.2PORT-1.71.22.71.2-7.80.98.40.814.25.7STJO1.30.7-0.70.8-0.61.0-3.81.08.76.7TRAL-2.11.22.51.0-6.50.85.60.814.35.4ELSE0.70.6-0.20.6-1.81.00.80.911.96.2LEON-2.21.23.41.5-10.31.25.21.218.68.4AMER3.91.0-3.41.4-0.71.3-8.01.215.58.5BRUC-1.31.21.91.1-4.00.95.60.814.05.9SANT-3.61.23.81.1-7.31.17.91.218.18.2VASO2.10.7-1.80.80.41.0-3.21.011.56.9CORR-0.41.21.51.5-5.91.13.61.114.57.3PAJ3-3.11.43.71.9-8.51.16.71.110.48.0BURD-0.31.01.11.0-10.10.92.10.919.76.4CRO3-3.51.23.71.0-8.41.15.31.117.97.0NASA-7.92.17.81.8-7.90.98.70.816.95.6LOMP-2.41.12.60.8-5.81.14.41.1-3.29.3COME1.40.9-0.61.0-1.00.9-5.60.929.57.6ODAM0.80.8-0.20.80.50.9-1.80.99.76.1GILR5.81.4-4.01.82.21.2-8.71.2-25.416.7